3.0.0
4408
2023-05-11T15:45:15Z
2023-05-11T15:45:15Z
House
HR
2021-07-13
117
[Congressional Record Volume 167, Number 122 (Tuesday, July 13, 2021)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. BURCHETT:H.R. 4408.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8[Page H3625]
- hswm00
Ways and Means Committee
House
Standing
  - Referred to
2021-07-13T13:03:05Z

- Carbon Capture Improvement Act of 2021
117
1829
S
2021-05-26
Read twice and referred to the Committee on Finance.
  - Identical bill
CRS
- 2021-07-13
Referred to the House Committee on Ways and Means.
IntroReferral
H11100
2
House floor actions
  - hswm00
Ways and Means Committee
- 2021-07-13
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2021-07-13
Introduced in House
IntroReferral
1000
9
Library of Congress
- B001309
Rep. Burchett, Tim [R-TN-2]
Tim
Burchett
R
TN
2
N
- S001185
Rep. Sewell, Terri A. [D-AL-7]
Terri
Sewell
D
AL
A.
7
2021-07-13
True
- S000168
Rep. Salazar, Maria Elvira [R-FL-27]
Maria
Salazar
R
FL
Elvira
27
2021-07-13
True
- M001180
Rep. McKinley, David B. [R-WV-1]
David
McKinley
R
WV
B.
1
2021-07-13
True
- H001077
Rep. Higgins, Clay [R-LA-3]
Clay
Higgins
R
LA
3
2021-07-13
True
- G000597
Rep. Garbarino, Andrew R. [R-NY-2]
Andrew
Garbarino
R
NY
R.
2
2021-07-13
True
- M001199
Rep. Mast, Brian J. [R-FL-18]
Brian
Mast
R
FL
J.
18
2021-07-13
True
- Z000017
Rep. Zeldin, Lee M. [R-NY-1]
Lee
Zeldin
R
NY
M.
1
2021-07-16
False
- S000522
Rep. Smith, Christopher H. [R-NJ-4]
CHRISTOPHER
SMITH
R
NJ
H.
4
2021-09-17
False
Taxation
- Air quality
- Climate change and greenhouse gases
- Income tax exclusion
- Industrial facilities
- Manufacturing
- Oil and gas
- Securities
Taxation
00
2021-07-13
Introduced in House
2021-08-11T17:05:03Z
Carbon Capture Improvement Act of 2021
This bill authorizes the issuance of tax-exempt facility bonds for the financing of qualified carbon dioxide capture facilities.
A qualified carbon dioxide capture facility is any equipment installed in an industrial carbon dioxide facility that satisfies specified capture and storage requirements and (1) is used for the capture, treatment and purification, compression, transportation, or on-site storage of carbon dioxide produced by the industrial carbon dioxide facility; or (2) is integral or functionally related and subordinate to a gasification process that converts a product from coal, petroleum residue, biomass, or other materials that are recovered for their energy or feedstock value into a synthesis gas composed primarily of carbon dioxide and hydrogen for direct use or subsequent chemical or physical conversion.

Carbon Capture Improvement Act of 2021
- Official Title as Introduced

To amend the Internal Revenue Code of 1986 to provide for the issuance of exempt facility bonds for qualified carbon dioxide capture facilities.
Introduced in House
IH
- Display Title

Carbon Capture Improvement Act of 2021
- Short Title(s) as Introduced

Carbon Capture Improvement Act of 2021
Introduced in House
IH
- Introduced in House
2021-07-13T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr4408ih/xml/BILLS-117hr4408ih.xml
2021-07-13
Referred to the House Committee on Ways and Means.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.