3.0.0
3728
2023-04-28T13:30:20Z
2023-04-28T13:30:20Z
House
HR
2021-06-04
117
[Congressional Record Volume 167, Number 97 (Friday, June 4, 2021)][House]From the Congressional Record Online through the Government Publishing Office [www.gpo.gov]By Mr. PASCRELL:H.R. 3728.Congress has the power to enact this legislation pursuantto the following:Article I, Section 8 of the United States Constitution.[Page H2693]
- hspw00
Transportation and Infrastructure Committee
House
Standing
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
    - Referred to
2021-06-07T16:38:30Z
  - Referred to
2021-06-04T13:36:40Z
- hssy00
Science, Space, and Technology Committee
House
Standing
  - hssy15
Research and Technology Subcommittee
    - Referred to
2021-06-04T14:48:19Z
  - Referred to
2021-06-04T13:36:35Z

- Fire Station Construction Grants Act
117
4690
S
2022-08-01
Read twice and referred to the Committee on Homeland Security and Governmental Affairs.
  - Related bill
CRS
- 2021-06-07
  - hspw13
Economic Development, Public Buildings, and Emergency Management Subcommittee
1
House committee actions
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
Committee
- 2021-06-04
  - hssy15
Research and Technology Subcommittee
1
House committee actions
Referred to the Subcommittee on Research and Technology.
Committee
- 2021-06-04
Referred to the Committee on Science, Space, and Technology, and in addition to the Committee on Transportation and Infrastructure, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hspw00
Transportation and Infrastructure Committee
- 2021-06-04
Referred to the Committee on Science, Space, and Technology, and in addition to the Committee on Transportation and Infrastructure, for a period to be subsequently determined by the Speaker, in each case for consideration of such provisions as fall within the jurisdiction of the committee concerned.
IntroReferral
H11100
2
House floor actions
  - hssy00
Science, Space, and Technology Committee
- 2021-06-04
Introduced in House
IntroReferral
Intro-H
9
Library of Congress
- 2021-06-04
Introduced in House
IntroReferral
1000
9
Library of Congress
- P000096
Rep. Pascrell, Bill, Jr. [D-NJ-9]
WILLIAM
PASCRELL
D
NJ
J.
9
N
- F000466
Rep. Fitzpatrick, Brian K. [R-PA-1]
Brian
Fitzpatrick
R
PA
K.
1
2021-06-04
True
- B001295
Rep. Bost, Mike [R-IL-12]
Mike
Bost
R
IL
12
2021-06-04
True
- G000559
Rep. Garamendi, John [D-CA-3]
John
Garamendi
D
CA
3
2021-06-04
True
- B001285
Rep. Brownley, Julia [D-CA-26]
Julia
Brownley
D
CA
26
2021-06-04
True
- H001068
Rep. Huffman, Jared [D-CA-2]
Jared
Huffman
D
CA
2
2021-06-04
True
- C001112
Rep. Carbajal, Salud O. [D-CA-24]
Salud
Carbajal
D
CA
O.
24
2021-06-04
True
- S001207
Rep. Sherrill, Mikie [D-NJ-11]
Mikie
Sherrill
D
NJ
11
2021-06-04
True
- M001203
Rep. Malinowski, Tom [D-NJ-7]
Tom
Malinowski
D
NJ
7
2021-06-16
False
- C001090
Rep. Cartwright, Matt [D-PA-8]
Matt
Cartwright
D
PA
8
2021-06-23
False
- H001038
Rep. Higgins, Brian [D-NY-26]
Brian
Higgins
D
NY
26
2021-06-25
False
- V000133
Rep. Van Drew, Jefferson [R-NJ-2]
Jefferson
Van Drew
R
NJ
2
2021-06-25
False
- N000147
Del. Norton, Eleanor Holmes [D-DC-At Large]
ELEANOR
NORTON
D
DC
HOLMES
0
2021-06-25
False
- G000583
Rep. Gottheimer, Josh [D-NJ-5]
Josh
Gottheimer
D
NJ
5
2021-06-28
False
- S001190
Rep. Schneider, Bradley Scott [D-IL-10]
Bradley
Schneider
D
IL
Scott
10
2021-06-30
False
- B001286
Rep. Bustos, Cheri [D-IL-17]
Cheri
Bustos
D
IL
17
2021-07-01
False
- N000015
Rep. Neal, Richard E. [D-MA-1]
RICHARD
NEAL
D
MA
E.
1
2021-07-16
False
- S001201
Rep. Suozzi, Thomas R. [D-NY-3]
Thomas
Suozzi
D
NY
R.
3
2021-07-16
False
- C001055
Rep. Case, Ed [D-HI-1]
Ed
Case
D
HI
1
2021-07-22
False
- P000616
Rep. Phillips, Dean [D-MN-3]
Dean
Phillips
D
MN
3
2021-07-26
False
- P000593
Rep. Perlmutter, Ed [D-CO-7]
Ed
Perlmutter
D
CO
7
2021-07-28
False
- H001047
Rep. Himes, James A. [D-CT-4]
James
Himes
D
CT
A.
4
2021-08-10
False
- L000562
Rep. Lynch, Stephen F. [D-MA-8]
Stephen
Lynch
D
MA
F.
8
2021-08-10
False
- D000630
Rep. Delgado, Antonio [D-NY-19]
Antonio
Delgado
D
NY
19
2021-09-07
False
- T000469
Rep. Tonko, Paul [D-NY-20]
Paul
Tonko
D
NY
20
2021-09-07
False
- T000478
Rep. Tenney, Claudia [R-NY-22]
Claudia
Tenney
R
NY
22
2021-09-07
False
- M000312
Rep. McGovern, James P. [D-MA-2]
JAMES
MCGOVERN
D
MA
P.
2
2021-10-08
False
- G000597
Rep. Garbarino, Andrew R. [R-NY-2]
Andrew
Garbarino
R
NY
R.
2
2021-11-16
False
- S001196
Rep. Stefanik, Elise M. [R-NY-21]
Elise
Stefanik
R
NY
M.
21
2021-12-07
False
- R000599
Rep. Ruiz, Raul [D-CA-36]
Raul
Ruiz
D
CA
36
2022-01-18
False
- H001085
Rep. Houlahan, Chrissy [D-PA-6]
Chrissy
Houlahan
D
PA
6
2022-01-18
False
- H001081
Rep. Hayes, Jahana [D-CT-5]
Jahana
Hayes
D
CT
5
2022-03-24
False
- D000619
Rep. Davis, Rodney [R-IL-13]
Rodney
Davis
R
IL
13
2022-03-24
False
- L000578
Rep. LaMalfa, Doug [R-CA-1]
Doug
LaMalfa
R
CA
1
2022-03-24
False
- K000394
Rep. Kim, Andy [D-NJ-3]
Andy
Kim
D
NJ
3
2022-03-28
False
- K000382
Rep. Kuster, Ann M. [D-NH-2]
Ann
Kuster
D
NH
M.
2
2022-03-28
False
- M000687
Rep. Mfume, Kweisi [D-MD-7]
KWEISI
MFUME
D
MD
7
2022-07-29
False
- M001163
Rep. Matsui, Doris O. [D-CA-6]
Doris
Matsui
D
CA
O.
6
2022-11-14
False
- L000593
Rep. Levin, Mike [D-CA-49]
Mike
Levin
D
CA
49
2022-12-22
False
Emergency Management
- Building construction
- Buy American requirements
- Emergency medical services and trauma care
- Government buildings, facilities, and property
- Health facilities and institutions
- Housing industry and standards
- Wages and earnings
Emergency Management
00
2021-06-04
Introduced in House
2021-12-06T20:37:04Z
This bill directs the Federal Emergency Management Agency (FEMA) to establish a grant program to modify, upgrade, and construct fire and emergency medical services (EMS) department facilities.
Grant recipients may use funds received to
- build, rebuild, or renovate fire and EMS department facilities;
- upgrade existing facilities to install exhaust emission control systems, install backup power systems, upgrade or replace environmental control systems (such as HVAC systems), remove or remediate mold, and construct or modify living quarters for use by male and female personnel; and
- upgrade fire and EMS stations or build new stations.
The bill sets forth provisions regarding (1) grant fund allocations between career and volunteer fire and EMS departments, and (2) prevailing rate of wage and a requirement for using materials produced domestically for public contracts.

To provide grants for fire station construction through the Administrator of the Federal Emergency Management Agency, and for other purposes.
- Display Title

To provide grants for fire station construction through the Administrator of the Federal Emergency Management Agency, and for other purposes.
- Official Title as Introduced

To provide grants for fire station construction through the Administrator of the Federal Emergency Management Agency, and for other purposes.
Introduced in House
IH
- Introduced in House
2021-06-04T04:00:00Z
  - https://www.govinfo.gov/content/pkg/BILLS-117hr3728ih/xml/BILLS-117hr3728ih.xml
2021-06-07
Referred to the Subcommittee on Economic Development, Public Buildings, and Emergency Management.
text/xml
EN
Pursuant to Title 17 Section 105 of the United States Code, this file is not subject to copyright protection and is in the public domain.
Congressional Research Service, Library of Congress
This file contains bill summaries and statuses for federal legislation. A bill summary describes the most significant provisions of a piece of legislation and details the effects the legislative text may have on current law and federal programs. Bill summaries are authored by the Congressional Research Service (CRS) of the Library of Congress. As stated in Public Law 91-510 (2 USC 166 (d)(6)), one of the duties of CRS is "to prepare summaries and digests of bills and resolutions of a public general nature introduced in the Senate or House of Representatives". For more information, refer to the User Guide that accompanies this file.